CHAPTER 5. RESULTS 142

Q^2 (GeV^2) W_{max} (GeV) 0.15-0.18 2.0 0.18-0.22 2.0 0.22-0.27 2.1 0.27-0.33 2.1 0.33-0.41 2.6 0.41-0.5 2.6 0.5-0.6 2.5 0.6-0.74 2.5 0.74-0.90 2.4 0.9-1.10 2.4 1.10-1.35 2.3 1.35-1.64 2.2 1.64-2.01 2.2 Table 5.2: Integration Limit in W for Q^2 bins