 0

 2

 4

 6

 8

10

12

14

     0.8 1 1.2 1.4 1.6 1.8 2 2.2

 0

 2

 4

 6

 8

10

12

14

16

     0.8 1 1.2 1.4 1.6 1.8 2 2.2

                     W (GeV)

Data (nh3) MC (PF=60%) MC (PF=50%) lo, para bot nh3 (43737) (Carbon 43743)

 W (Scaled)

Data MC x 1.15259 MC x 1.15259 (c:Peter)

PF=52.6052 +- 0.231542% W range: ( 1.5, 1.8 )