 0

 2

 4

 6

 8

10

12

14

16

     0.8 1 1.2 1.4 1.6 1.8 2 2.2

                    W (Scaled)

    COMMON /PAWC/ in memory

Data MC (C:Peter)

PF (low W)=51.9% PF (high W)=51.9%

                      W

COMMON /PAWC/ in memory

Ratio (Data/MC)

0.6

0.7

0.8

0.9

  1

1.1

1.2

      0.8 1 1.2 1.4 1.6 1.8 2 2.2