0.04

0.05

0.06

0.07

0.08

0.09 0.1 0.11

0.12

1 1.2 1.4 1.6 1.8 2 2.2

C12 cross section per nucleon

W [GeV]

Hall C Oct.2005 C12/nucleon data 4.6 GeV 16 deg. QFS C12 QFS*1.04 (low W) QFS*0.96 (high W) P.B. model*1.08 E.C. model*1.08