 0

 2

 4

 6

 8

10

12

14

16

18

     0.8 1 1.2 1.4 1.6 1.8 2 2.2

                    W (Scaled)

Data MC(ALL) MC(Deut) 5 Yscaling,HallC,wpi=1.038 MC(No Deut) 5 QFS Data-MC(No Deut)

43855 (hi), 43950 (low) nd3 , para , top

PF (low W)=52.3% PF (high W)=52.3%

 W

Ratio: /

(Data-MC(no D)) MC(D)

  0

0.2

0.4

0.6

0.8

  1

1.2

1.4

1.6

1.8

  2

      0.8 1 1.2 1.4 1.6 1.8 2 2.2