  0

  2

  4

  6

  8

   0.5 1 1.5 2

                             0.6

                             0.8

                               1

                             1.2

                                0.5 1 1.5 2

  0

  2

  4

  6

   0.5 1 1.5 2

                             0.6

                             0.8

                               1

                             1.2

                                0.5 1 1.5 2

  0

0.5

  1

1.5

  2

   0.5 1 1.5 2

                             0.6

                             0.8

                               1

                             1.2

                                0.5 1 1.5 2

          W (GeV)

MC data

che: Run=43935

 W

data / MC: r=1.00443 +- 0.00372191

W (GeV)

MC data

cnohe: Run=43982

 W

data / MC: r=1.02928 +- 0.00373334

w

MC data

He (C subtracted)

 W

data / MC: r=0.90981 +- 0.00259405