  0

  5

 10

        1 1.5 2

                             0.6

                             0.8

                               1

                             1.2

                                     1 1.5 2

  0

2.5

  5

7.5

 10

        1 1.5 2

                             0.6

                             0.8

                               1

                             1.2

                                     1 1.5 2

  0

  1

  2

  3

        1 1.5 2

                             0.6

                             0.8

                               1

                             1.2

                                     1 1.5 2

          W (GeV)

MC data

che: Run=43363

 W

data / MC: r=1.01111 +- 0.00331252

W (GeV)

MC data

cnohe: Run=43361

 W

data / MC: r=1.01748 +- 0.0034666

w

MC data

He (C subtracted)

 W

data / MC: r=0.979969 +- 0.00310945