0

1

2

3

4

5

 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

0

1

2

3

4

5

 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

                     W (GeV)

Data (nh3) MC with PF=60% MC with PF=50% hi, para top nh3 (Run 43724) (Carbon (Run 43775))

W (GeV)

Data x 0.874852 MC with PF=60% MC with PF=50%

PF=55.5151% W range: ( 1.1, 1.5 )