   0

0.25

 0.5

0.75

   1

1.25

 1.5

1.75

   2

    0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

 0.6

 0.7

 0.8

 0.9

   1

 1.1

 1.2

    0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

                          w

                    Pure Carbon (He subtracted)

MC data

 W

data / MC: r=0.761568 +- 0.0014944