   0

   2

   4

    0.75 1 1.25 1.5

                              0.6

                              0.8

                                1

                              1.2

                                 0.75 1 1.25 1.5

   0

   1

   2

   3

    0.75 1 1.25 1.5

                              0.6

                              0.8

                                1

                              1.2

                                 0.75 1 1.25 1.5

   0

0.25

 0.5

0.75

   1

    0.75 1 1.25 1.5

                              0.6

                              0.8

                                1

                              1.2

                                 0.75 1 1.25 1.5

           W (GeV)

MC data

che: Run=43983

 W

data / MC: r=1.06601 +- 0.00348414

W (GeV)

MC data

cnohe: Run=43982

 W

data / MC: r=1.08955 +- 0.00387427

w

MC data

He (C subtracted)

 W

data / MC: r=0.978665 +- 0.00281851