0

1

2

3

4

5

 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

0

1

2

3

4

5

 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 1.5 1.6 1.7

                     W (GeV)

Data (nh3) MC (PF=60%) MC (PF=50%) hi, para bot nh3 (43801) (Carbon 43774)

 W (Scaled)

Data MC x 1.03711 MC x 1.03711

PF=57.1529 +- 0.234859% W range: ( 1.1, 1.5 )