              W_off histogram at W=1205

                                   ID
                                   Entries
                                   Mean
                                   RMS

                                                110
                                              11266
                                              1115.
                                              226.4

      psmear_histos.hbook

              W_off histogram at W=1505

                                   ID
                                   Entries
                                   Mean
                                   RMS

                                                120
                                               8544
                                              1381.
                                              267.2

      psmear_histos.hbook

              W_off histogram at W=1805

                                   ID
                                   Entries
                                   Mean
                                   RMS

                                                130
                                               8020
                                              1676.
                                              264.2

      psmear_histos.hbook

   0

0.05

 0.1
x 10^{-2}

     0 250 500 750 1000 1250 1500 1750 2000 2250

   0

 0.2

 0.4

 0.6
x 10^{-3}

     0 250 500 750 1000 1250 1500 1750 2000 2250

   0

 0.2

 0.4
x 10^{-3}

     0 250 500 750 1000 1250 1500 1750 2000 2250