W (GeV)

NH_3 para

Data MC MC/Data Ratio

W (GeV)

NH_3 perp

W (GeV)

ND_3 para

W (GeV)

ND_3 perp

0 10 20 30

1 1.5 0.5 0.75 1 1.25 1.5

1 1.5

0 10 20

1 1.5 0.5 0.75 1 1.25 1.5

1 1.5

0 10 20 30

1 1.5 0.5 0.75 1 1.25 1.5

1 1.5

0 10 20 30

1 1.5 0.5 0.75 1 1.25 1.5

1 1.5