Data MC θ_e=13.08

θ_e=13.15

RUN 43547 4083 Perp

0 2 4 6 8

11 11.5 12 12.5 13 13.5 14 14.5 15 15.5 16

0 2 4 6 8 10

11 11.5 12 12.5 13 13.5 14 14.5 15 15.5 16