Data MC θ_e=13.08

θ_e=13.15

RUN 43536 4709 Perp

0 1 2 3 4 5 6

11 11.5 12 12.5 13 13.5 14 14.5 15 15.5 16

0 1 2 3 4 5 6 7

11 11.5 12 12.5 13 13.5 14 14.5 15 15.5 16