W (GeV) 0 0.5 1 1.5

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

11.5 Λ θ_e Λ 12

W (GeV) 0 1 2 3 4

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

12 Λ θ_e Λ 12.5

W (GeV) 0 1 2 3 4

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

12.5 Λ θ_e Λ 13

W (GeV) 0 1 2 3 4

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

13 Λ θ_e Λ 13.5

W (GeV) 0 1 2 3

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

13.5 Λ θ_e Λ 14

W (GeV) 0 0.5 1 1.5 2 2.5

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

14 Λ θ_e Λ 14.5

W (GeV) 0 0.5 1 1.5

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

14.5 Λ θ_e Λ 15

W (GeV) 0 0.2 0.4 0.6 0.8

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5

15 Λ θ_e Λ 15.5

W (GeV) 0 5 10 15 20

1 1.5

C12 perp

0.5 0.75 1 1.25 1.5

1 1.5