W [GeV]

1.1 1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9

-10

-5

0

5

10

15

2 > = 1.86 GeV 2 <Q LTσ SANE-HMS 2 > = 1.3 GeV 2 <Q LTσ RSS following data kinematics LTσ MAID2007 2 = 2.0 GeV 2 Q LTσ MAID2007 2 = 1.6 GeV 2 Q LTσ MAID2007 2 = 1.3 GeV 2 Q LTσ MAID2007