       z beam

                      ID
                      Entries
                      Mean
                      RMS

                                   108
                                  7571
                                0.3780
                                 1.939

/work/hallc/sane/rondon/sane_hms/rondon_hms73026.1.rzdat

                                            2009/05/27   19.47

C+He 73026

       z beam

                      ID
                      Entries
                      Mean
                      RMS

                                   108
                                  8007
                                0.5498
                                 1.823

/work/hallc/sane/rondon/sane_hms/rondon_hms73027.1d.rzdat

C 73027

      z beam2

                      ID
                      Entries
                      Mean
                      RMS

                                   109
                                 16014
                                0.5498
                                 1.823

/work/hallc/sane/rondon/sane_hms/rondon_hms73026.1.rzdat

C+He outer

   0

 200

 400

 600

 800

1000

    -10 -5 0 5 10

                                0

                              200

                              400

                              600

                              800

                             1000

                                 -10 -5 0 5 10

   0

 200

 400

 600

 800

1000

    -10 -5 0 5 10