                    zbeam

                             Entries
                             Mean
                             RMS

                                         1335
                                       0.4692
                                        1.224

/work/hallc/sane/rondon/sane_hms/rondon_hms73027.1.rzdat

                                            2009/06/01   13.00

abs(srx) = 1mm

abs(hsdelta) = 9

abs(hsyptar).le. 5 mr

                    zbeam

                             Entries
                             Mean
                             RMS

                                        48002
                                       0.5031
                                        1.493

/work/hallc/sane/rondon/sane_hms/rondon_hms73027.1.rzdat

abs(hsdelta) = 9

   0

  20

  40

  60

  80

 100

 120

 140

 160

    -5 -4 -3 -2 -1 0 1 2 3 4 5

   0

 500

1000

1500

2000

2500

3000

3500

    -5 -4 -3 -2 -1 0 1 2 3 4 5