0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

20

40

60

80

100

120

140 310× Toroidal Mirrors

=1000MeV min E Ratio =0.13709

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0 1000

2000

3000

4000

5000

6000

7000

8000

=1000MeV min E Ratio =0.09410

Spherical Mirrors