0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

2

4

6

8

10

12

14 310× Toroidal Mirrors

=2250MeV min E Ratio =0.11393

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0 2 4 6 8 10 12 14 16 18 20 22

=2250MeV min E Ratio =0.04076

Spherical Mirrors