0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

10

20

30

40

50

60

70 310× Toroidal Mirrors

=1050MeV min E Ratio =0.13411

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

1000

2000

3000

4000

5000

6000

=1050MeV min E Ratio =0.32479

Spherical Mirrors