0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

5

10

15

20

25

310× Toroidal Mirrors

=1400MeV min E Ratio =0.11252

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0 100 200 300 400 500 600 700 800

=1400MeV min E Ratio =0.21045

Spherical Mirrors