0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

2

4

6

8

10

12

14 310× Toroidal Mirrors

=1700MeV min E Ratio =0.11363

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 4.0 4.5 5.0 0

50

100

150

200

250

300

=1700MeV min E Ratio =0.19634

Spherical Mirrors