θ 25 30 35 40 45 50 55 ϕ

-60

-40

-20

0

20

40

60

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0 in BigCal Coords ϕ and θ Detector Efficiency vs

θ 25 30 35 40 45 50 55 ϕ

-60

-40

-20

0

20

40

60

0 2 4 6 8 10 12 14 16 18 20

Phi vs Theta with cuts

E 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0 2.2 2.4

∈

10

210

310_{All Events with BETA2}

DIS Events passing cuts

Pion Events passing cuts

All Events passing cuts

E

E 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0 2.2 2.4

∈

0.0

0.5

1.0

1.5

2.0

2.5 =25 deg θ Fersch =30 deg θ Fersch =40 deg θ Fersch =50 deg θ Fersch

E

θ 25 30 35 40 45 50 55

∈

0

50

100

150

200

250

300 theta

θ 25 30 35 40 45 50 55

∈

0

1

2

3

4

5 theta

ϕ -60 -40 -20 0 20 40 60 0

50

100

150

200

250 phi

ϕ -60 -40 -20 0 20 40 60 0.0

0.5

1.0

1.5

2.0

2.5

3.0 phi