60 80 100 120 140 160 180 200 220 240 0

1000

2000

3000

4000

5000

6000 Old calibration

New calibration

test stacked histograms

60 80 100 120 140 160 180 200 220 240

10

20

30

40

50

0

50

100

150

200

250

YvsMass-0

60 80 100 120 140 160 180 200 220 240 0

2

4

6

8

10

12

14

16

18

20

0

200

400

600

800

1000

1200

AnglevsMass-0